<?php
global $PCO_PostAccionDirecta, $id, $accionForm;
$PCO_PostAccionDirecta = 1;
//$PCO_PostAccion = 1;
$accionForm = "Guardada";
if($id)
    $accionForm = "Actualizada";
PCO_Mensaje("Aviso del sistema","ARL $accionForm correctamente!", '', 'fa fa-thumbs-up fa-5x icon-green texto-blink', 'alert alert-success alert-dismissible');
PCO_CargarFormulario(12);